/*
 Navicat Premium Data Transfer

 Source Server         : 本地
 Source Server Type    : MySQL
 Source Server Version : 50726
 Source Host           : localhost:3306
 Source Schema         : update

 Target Server Type    : MySQL
 Target Server Version : 50726
 File Encoding         : 65001

 Date: 13/11/2022 00:25:04
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for up_blacklog
-- ----------------------------
DROP TABLE IF EXISTS `up_blacklog`;
CREATE TABLE `up_blacklog`  (
  `id` int(10) NOT NULL AUTO_INCREMENT COMMENT 'ID',
  `sn` varchar(60) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT '' COMMENT '设备序列号',
  `name` varchar(60) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '设备名称',
  `dev_type` varchar(120) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '设备型号',
  `v` varchar(30) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT '' COMMENT '固件版本',
  `localid` varchar(32) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT '' COMMENT 'localid',
  `mac` varchar(20) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT '' COMMENT 'MAC',
  `ip` varchar(50) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT 'IP',
  `createtime` int(10) NULL DEFAULT NULL COMMENT '创建时间',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = MyISAM AUTO_INCREMENT = 8 CHARACTER SET = utf8 COLLATE = utf8_general_ci COMMENT = '黑名单日志' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of up_blacklog
-- ----------------------------
INSERT INTO `up_blacklog` VALUES (4, '设备序列号', '设备名称', '设备型号', '固件版本', 'asdasdasd', 'ad-sad-asd-sd-a', '127.0.0.1', 1668270160);
INSERT INTO `up_blacklog` VALUES (3, '设备序列号', '设备名称', '设备型号', '固件版本', 'asdasdasd', 'ad-sad-asd-sd-a', '127.0.0.1', 1668269850);
INSERT INTO `up_blacklog` VALUES (5, '设备序列号', '设备名称', '设备型号', '固件版本', 'asdasdasd', 'ad-sad-asd-sd-a', '127.0.0.1', 1668270162);
INSERT INTO `up_blacklog` VALUES (6, '设备序列号', '设备名称', '设备型号', '固件版本', 'asdasdasd', 'ad-sad-asd-sd-a', '127.0.0.1', 1668270185);
INSERT INTO `up_blacklog` VALUES (7, '设备序列号', '设备名称', '设备型号', '固件版本', 'asdasdasd', 'ad-sad-asd-sd-a', '127.0.0.1', 1668270186);

SET FOREIGN_KEY_CHECKS = 1;
